Mem. S.A.It. Suppl. Erratum 1 © SAIt 2007 Memorie della

Erratum

The CREAM balloon experiment

A. Castellina^1, M.G. Bagliesi^2, G. Bigongiari^2, P.S. Marrocchesi^2 , P. Maestro^2, and R. Zei^2

1 Istituto Nazionale di Astrofisica, IFSI/ INFN, Sez.Torino, via P.Giuria 1, I-10125 Torino, Italy, - e-mail: castelli@to.infn.it 2 Department of Physics, University of Siena/ INFN, v.Roma 56, I-53100 Siena, Italy

Mem.SAIt Suppl. 9, 385-387 (2006)

Key words. Errata

The paper was not reviewed and released for publication by the CREAM collaboration and is thus not endorsed by the collaboration.

The CREAM collaboration:

H.S. Ahn, O. Ganel, K.C. Kim, M.H. Lee, L. Lutz, A. Malinin, E.S. Seo, R. Sina, J. Wu, Y.S.Yoon, S.Y. Zinn University of Maryland, USA

P. Boyle, S. Swordy, S. Wakely University of Chicago, USA

N.B. Conklin, S. Coutu, S.I. Mognet Penn State University, USA

P. Allison, J.J. Beatty Ohio State University, USA

J.T. Childers, M.A. Duvernois University of Minnesota, USA

M.G. Bagliesi, G. Bigongiari, P. Maestro, P.S. Marrocchesi, R. Zei University of Siena and INFN, Italy

J.H. Han, H.J. Hyun, J. A. Jeon, J. K. Lee, S.W. Nam, I.H. Park, N.H. Park, J. Yang Ewha Womans University, S. Korea

2 A. Castellina et al.: Erratum S. Nutter Northern Kentucky University, USA S. Minnick Kent State University, USA H. Park Kyungpook National University, S. Korea